HBT with Squeezed C (k ,k )_{2 1 2}

- 1 - 0.5 0 0.5 1 k (GeV) 1

- 1 - 0.5 0 0.5 1 k (GeV) 2

2

3

4

1 k (GeV) 1

0 1